0 1 2 3 x10^5

0 100 200 300 400 500 600

horizontal pixel index, ‘‘x’’ autocorrelation

.25 .5 .75 1

-0.5 -0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5

fractional frequency normalized Fourier magnitude