-4

-2

0

2

4

-0.5 -0.4 -0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5

SOME ONE DIMENSIONAL GABOR FUNCTIONS WHICH BELONG TO THE AFFINE GROUP

TIME, normalized to a 1 sec interval