-1

0

1

-0.5 0 0.5

0 10 20 30

-0.5 0 0.5

Wave packets with poor physical resolution...

-1

0

1

-0.5 0 0.5

0 10 20 30

-0.5 0 0.5

...may have good Fourier resolution.