8E75 plate

‘‘pinhole’’ lens on board furniture

scale model

(open at right) of author’s dwelling

collimated object and reference beam

(e.g. round table)

motion picture film

spatial filter

microscope objective projector

8E75 plate on movable mount

collimated reference beam frame 1

(rightmost)

frame 2

frame 41

(leftmost) picture with morning sun

picture with afternoon sun

(a) (b)

(moves into and out of page, approx.

3mm/frame

attenuator