Comparison of the 2 previous lightspaces

all the arrows are in the same plane defined by flash and nonflash lighting.

This axis might have been obtained by using XR film

This axis might have been obtained by using two flashes of different strengths operating in rapid succession on 2 separate pieces of regular film