\documentstyle[psfig,12pt]{article}
\newlength{\prw}
\setlength{\prw}{5in} %  book is 5+3/4 wide; make it a bit less...
\textwidth = \prw
\oddsidemargin = -.25in
\input{/home/mcbuff/steve/thesis/figcommands}
\begin{document}

\vspace{-.001\prw}
\figc{Progress_in.eps,width=\prw}  % made in ``fig'' which is a drawing prog
                                     % which gives PS TimesRoman default
%%\figc{dot_pr.eps,width=\prw}

\vspace{1in}

\hspace{-.023\prw} % i dont know why i need to do this; was very careful about BB
\centerline{
  \psfig{figure=/home/mcbuff/steve/512_432/keyeq.eps,width=\prw}
}%endcenterline

\figc{dot_pr.eps,width=\prw}

\end{document}

