\documentstyle[psfig,12pt]{article}
\textwidth = 7in
\oddsidemargin = -.25in
\input{../figcommands}
\begin{document}

\figc{dot_clt.eps,width=7in}

\begin{center}
\Huge
The Chirplet Transform and Other\\ Novel Time Frequency Methods\\
With Applications to Doppler Radar\\

\end{center}

\end{document}

