-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 0 100 200

Quantity of light, Q

Pixel value

Response curves recovered from differently exposed images

-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 0

0.5

1

Quantity of light, Q

Certainty

Certainty functions (derivatives of response curves)