50 100 150 200 250 0

50

100

150

200

250 Range�Range plots for k = 1/16 to k = 16

k=1 k=2 k=4 k=8 k=16 k=1/2 k=1/4 k=1/8 k=1/16

0 50 100 150 200 250 0

50

100

150

200

250 Synthetic Range�Range plots for various ag values