-1 -0.5 0 0.5 1

-0.5 0 0.5 real(s(t))

Time

-0.5

0

0.5

-0.5 0 0.5 Time

Frequency

TF of signal, s

0 0.2 0.4 0.6 0.8 1

-0.5 0 0.5 Time

-0.5

0

0.5

-0.5 0 0.5 Time

Frequency

Initial Guess

Approximation after 1 itteration

-1 -0.5 0 0.5 1

-0.5 0 0.5 Time

-0.5

0

0.5

-0.5 0 0.5 Time

Frequency