0

0 100 200 300 400 500 600 700 800 900 1000 real part of initial sum of the 2 ‘‘wavelets’’

time (sample index)

0

0 100 200 300 400 500 600 700 800 900 1000 real part of sum of the 2 ‘‘wavelets’’ after several iterations

time (sample index)