0 5 10 15 20 25 30 35 40

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Kurtosis of each column of the Chirpiness-Freq (PF) chirplet plane

Chirpiness normalized on [0,1]